RT2MS.SAV -- Copies RT-11 files to MS-DOS diskettes		     17-Aug-91

Syntax:
    RT2MS dev:wldnam.typ dev:

Example:			Comments:
    RT2MS DK: DU1: 			!Copies all files to diskette
    RT2MS MY*.TXT DU1:			!Copies matching files to diskette

The first argument specifies the RT-11 which are to be copied. Normal RT-11
file name wild-cards are allowed.

The second argument specifies the device which will receive the copied files.
The device must contain an MS-DOS format disk. On our system the 5 1/4" drive
is DU1:

Bugs:
	Has no options.
	Cannot copy into MS-DOS subdirectories.
	Name conflicts cause files to be overwritten.
	Ignores any destination file name, if given, whether or not wildcarded
	  (that is, "RT2MS AFILE.C MYFILE.C" creates AFILE.C).
